>>

>>contents

The NOTES.HLP file provides an easy way to add your own information to the
QC Advisor.

The NOTES.HLP file is a minimally formatted ASCII help file that appears
in the Help window whenever you press a "Notes" button. Press the Alt+F1
key to return from the NOTES.HLP file to the QC Advisor.

The NOTES.HLP file contains three parts:

        Part           Description
        >>contents     Appears when you select the "Notes" button on the
                       Table of Contents screen. This is the part of the
                       NOTES.HLP file that is now being displayed.

        >>edit         Appears when you select the "Notes" button on the
                       Keyboard Shortcuts screen.

        >>index        Appears when you select the "Notes" button on the
                       Index screen.

To change the contents of the NOTES.HLP file you must do the following:

        1. Close the NOTES.HLP file if it is currently displayed in the
           Help window.

        2. Open the NOTES.HLP file with any editor (such as the QuickC
           editor) to edit NOTES.HLP.  Change anything in the file except
           the file name "NOTES.HLP" and lines that begin with the ">>"
           characters.  These lines are links to the buttons in the QC
           Advisor

        3. Save your modified NOTES.HLP file as a normal ASCII file.

        4. When you open NOTES.HLP with one of the "Notes" buttons in the
           QC Advisor, you will see your additions and changes.

        5. Press ALT+F1 to return to the QC Advisor.

To change the other parts of the QC Advisor such as the run-time library
help file QC.HLP or the graphics help file GRAPHICS.HLP, you will need to
use the HELPMAKE utility. This program is described in the QuickC Tool Kit
Reference book.

>>edit

The NOTES.HLP file provides an easy way to add your own information to the
QC Advisor.

The NOTES.HLP file is a minimally formatted ASCII help file that appears
in the Help window whenever you press a "Notes" button. Press the Alt+F1
key to return from the NOTES.HLP file to the QC Advisor.

The NOTES.HLP file contains three parts:

        Part           Description
        >>contents     Appears when you select the "Notes" button on the
                       Table of Contents screen.

        >>edit         Appears when you select the "Notes" button on the
                       QuickC Keys screen. This is the part of the
                       NOTES.HLP file that is now being displayed.

        >>index        Appears when you select the "Notes" button on the
                       Index screen.

To change the contents of the NOTES.HLP file you must do the following:

        1. Close the NOTES.HLP file if it is currently displayed in the
           Help window.

        2. Open the NOTES.HLP file with any editor (such as the QuickC
           editor) to edit NOTES.HLP.  Change anything in the file except
           the file name "NOTES.HLP" and lines that begin with the ">>"
           characters.  These lines are links to the buttons in the QC
           Advisor

        3. Save your modified NOTES.HLP file as a normal ASCII file.

        4. When you open NOTES.HLP with one of the "Notes" buttons in the
           QC Advisor, you will see your additions and changes.

        5. Press ALT+F1 to return to the QC Advisor.

To change the other parts of the QC Advisor such as the run-time library
help file QC.HLP or the graphics help file GRAPHICS.HLP, you will need to
use the HELPMAKE utility. This program is described in the QuickC Tool Kit
Reference book.

>>index

The NOTES.HLP file provides an easy way to add your own information to the
QC Advisor.

The NOTES.HLP file is a minimally formatted ASCII help file that appears
in the Help window whenever you press a "Notes" button. Press the Alt+F1
key to return from the NOTES.HLP file to the QC Advisor.

The NOTES.HLP file contains three parts:

        Part           Description
        >>contents     Appears when you select the "Notes" button on the
                       Table of Contents screen.

        >>edit         Appears when you select the "Notes" button on the
                       Keyboard Shortcuts screen.

        >>index        Appears when you select the "Notes" button on the
                       Index screen. This is the part of the NOTES.HLP
                       file that is now being displayed.

To change the contents of the NOTES.HLP file you must do the following:

        1. Close the NOTES.HLP file if it is currently displayed in the
           Help window.

        2. Open the NOTES.HLP file with any editor (such as the QuickC
           editor) to edit NOTES.HLP.  Change anything in the file except
           the file name "NOTES.HLP" and lines that begin with the ">>"
           characters.  These lines are links to the buttons in the QC
           Advisor

        3. Save your modified NOTES.HLP file as a normal ASCII file.

        4. When you open NOTES.HLP with one of the "Notes" buttons in the
           QC Advisor, you will see your additions and changes.

        5. Press ALT+F1 to return to the QC Advisor.

To change the other parts of the QC Advisor such as the run-time library
help file QC.HLP or the graphics help file GRAPHICS.HLP, you will need to
use the HELPMAKE utility. This program is described in the QuickC Tool Kit
Reference book.

